)^2c

(GeV/ μμM 1.5 2 2.5 3 3.5 4 4.5

2c Counts / 50 MeV/

500

1000

1500

2000

2500 10-50% c <12 GeV/ Tp 6<

)^2c

(GeV/ μμM 1.5 2 2.5 3 3.5 4 4.5

Ratio

1 1.2 1.4